\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{48}{|r}|}
\hline
Assembly & \# contigs ($\geq$ 0 bp) & \# contigs ($\geq$ 1000 bp) & \# contigs ($\geq$ 5000 bp) & \# contigs ($\geq$ 10000 bp) & \# contigs ($\geq$ 25000 bp) & \# contigs ($\geq$ 50000 bp) & Total length ($\geq$ 0 bp) & Total length ($\geq$ 1000 bp) & Total length ($\geq$ 5000 bp) & Total length ($\geq$ 10000 bp) & Total length ($\geq$ 25000 bp) & Total length ($\geq$ 50000 bp) & \# contigs & Largest contig & Total length & Reference length & GC (\%) & Reference GC (\%) & N50 & NG50 & N75 & NG75 & L50 & LG50 & L75 & LG75 & \# misassemblies & \# misassembled contigs & Misassembled contigs length & \# local misassemblies & \# unaligned mis. contigs & \# unaligned contigs & Unaligned length & Genome fraction (\%) & Duplication ratio & \# N's per 100 kbp & \# mismatches per 100 kbp & \# indels per 100 kbp & Largest alignment & Total aligned length & NA50 & NGA50 & NA75 & NGA75 & LA50 & LGA50 & LA75 & LGA75 \\ \hline
velvet-ctg & 17510 & 17510 & 5897 & 2278 & 202 & 5 & 90225299 & 90225299 & 61870406 & 36489743 & 6314356 & 267395 & 17510 & 58073 & 90225299 & 100272607 & 35.87 & 35.44 & 8011 & 7000 & 4081 & 3020 & 3246 & 3917 & 7184 & 9325 & 342 & 337 & 2228569 & 1080 & 9 & 1297 + 194 part & 4028338 & 85.620 & 1.004 & 0.00 & 49.51 & 23.64 & 58073 & 85981341 & 7730 & 6739 & 3720 & 2577 & 3303 & 4000 & 7487 & 9913 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
