\documentclass[12pt,a4paper]{article}
\begin{document}
\begin{table}[ht]
\begin{center}
\caption{All statistics are based on contigs of size $\geq$ 500 bp, unless otherwise noted (e.g., "\# contigs ($\geq$ 0 bp)" and "Total length ($\geq$ 0 bp)" include all contigs).}
\begin{tabular}{|l*{1}{|r}|}
\hline
Assembly & velvet-ctg \\ \hline
\# misassemblies & 342 \\ \hline
\hspace{5mm}\# relocations & 197 \\ \hline
\hspace{5mm}\# translocations & 103 \\ \hline
\hspace{5mm}\# inversions & 42 \\ \hline
\# misassembled contigs & 337 \\ \hline
Misassembled contigs length & 2228569 \\ \hline
\# local misassemblies & 1080 \\ \hline
\# unaligned mis. contigs & 9 \\ \hline
\# mismatches & 42507 \\ \hline
\# indels & 20297 \\ \hline
\hspace{5mm}\# indels ($\leq$ 5 bp) & 16121 \\ \hline
\hspace{5mm}\# indels ($>$ 5 bp) & 4176 \\ \hline
Indels length & 107012 \\ \hline
\end{tabular}
\end{center}
\end{table}
\end{document}
